INSERT INTO "user" (name, is_cox, is_admin, is_guest, pw) VALUES('admin', false, true, false, '$argon2id$v=19$m=19456,t=2,p=1$dS/X5/sPEKTj4Rzs/CuvzQ$4P4NCw4Ukhv80/eQYTsarHhnw61JuL1KMx/L9dm82YM');
INSERT INTO "user" (name, is_cox, is_admin, is_guest, pw) VALUES('rower', false, false, false, '$argon2id$v=19$m=19456,t=2,p=1$dS/X5/sPEKTj4Rzs/CuvzQ$jWKzDmI0jqT2dqINFt6/1NjVF4Dx15n07PL1ZMBmFsY');
INSERT INTO "user" (name, is_cox, is_admin, is_guest, pw) VALUES('guest', false, false, true, '$argon2id$v=19$m=19456,t=2,p=1$dS/X5/sPEKTj4Rzs/CuvzQ$GF6gizbI79Bh0zA9its8S0gram956v+YIV8w8VpwJnQ');
INSERT INTO "user" (name, is_cox, is_admin, is_guest, pw) VALUES('cox', true, false, false, '$argon2id$v=19$m=19456,t=2,p=1$dS/X5/sPEKTj4Rzs/CuvzQ$lnWzHx3DdqS9GQyWYel82kIotZuK2wk9EyfhPFtjNzs');
INSERT INTO "user" (name) VALUES('new');
